         180           3
   5.66208807289151        3.79923717458568        2.56021956405634     
   21.5366873384411        21.7666738390302        22.0312553944949     
 -1.685888159059666E-003  0.000000000000000E+000
   1.00118884881261       0.000000000000000E+000
  0.998252155221339       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
