         180           8
  0.392406769372368       0.121809690644101      -5.445817886636471E-002
 -0.246900591912927      -0.386828188525598      -0.538776844100676     
 -0.694840355436199      -0.782804684299317     
  -8.96350667758478       -8.65278174398617       -8.30434250975954     
  -7.90444194995661       -7.49578273216895       -7.11584462873553     
  -6.69463713870994       -6.35122848770635     
  8.447650175207913E-004  0.000000000000000E+000
  0.991623925862237       0.000000000000000E+000
  0.994527029209800       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
