         180           8
  -1.00969986387357 -1.47548605647789 -1.90459956010722 -2.23556452274771 -2.52061850136111 -2.76059239970231 -2.96868950762048 -3.22666562777382
  -17.5294548970401 -17.8580787841700 -18.0455408088354 -18.2739742047347 -18.5116441726415 -18.7415314345251 -18.8984941284531 -19.0974425539843
  -5.589549610682524E-004  0.000000000000000
   0.992768902472208  0.000000000000000
   0.995674096761862  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
