         180           8
   3.42419369791995        2.69729423523342        2.03319499066340     
   1.38607118469859       0.778673510579490       0.212978563943865     
 -0.361749475570663      -0.929575869427844     
  -8.64363383711683       -8.80883662827008       -9.02692887972086     
  -9.19371512464858       -9.33344698761558       -9.55434791796670     
  -9.82397596088875       -9.89529126055928     
  1.691489976560065E-004  0.000000000000000E+000
  0.992315263407677       0.000000000000000E+000
  0.995079416818383       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
