         180           8
   1.25898520548982       0.980059303477724       0.798049273945097     
  0.567981376568732       0.412011033812118       0.272249114195979     
  0.120700664411969      -0.112155422493258     
  -11.6518655527085       -11.4408003935488       -11.0913308741369     
  -10.6930225597515       -10.2997858801344       -9.91428966140900     
  -9.48312939694395       -9.17964179999414     
  4.442502683096966E-004  0.000000000000000E+000
  0.992005446339107       0.000000000000000E+000
  0.994773558569941       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
