         180           3
   12.2419910530574        10.2334212608222        8.12951600592242     
   19.6380126933146        20.0199997061133        20.4688142588926     
 -1.647026950913464E-003  0.000000000000000E+000
   1.00175253128031       0.000000000000000E+000
  0.998866467784240       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
