         180           8
  -5.49305844245195       -5.61707385793405       -5.62398089952787     
  -5.62997105837275       -5.59353859208942       -5.56120964951645     
  -5.52355066109101       -5.53126038683354     
  -18.6633870913726       -18.3612836019553       -18.0859040879195     
  -17.7555243064079       -17.3910343886297       -17.0069304936820     
  -16.7171685670843       -16.5103968047113     
  1.122250452029064E-003  0.000000000000000E+000
  0.992233646795100       0.000000000000000E+000
  0.994980322559095       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
