         180           3
   4.07872862699725        5.81995770541325        7.44860627908900     
   19.7385794225862        20.4019247029796        20.9484301402192     
 -1.734543239487925E-003  0.000000000000000E+000
   1.00055267701161       0.000000000000000E+000
  0.997546348237341       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
