         180           8
 -0.379231247603112      -0.467301041109808      -0.641661238741728     
 -0.817870709291643       -1.03232729194590       -1.17806057907559     
  -1.27965280288165       -1.36974911963724     
  -19.7351295862976       -19.6229832248652       -19.2589080897789     
  -18.8312344018522       -18.4114503285335       -18.0619616451533     
  -17.6790402461339       -17.2821419266086     
  1.801186854225254E-003  0.000000000000000E+000
  0.991315993859304       0.000000000000000E+000
  0.994247536411293       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
