         180           8
  0.160107873632251      -7.798315048325860E-002 -0.274434260964202     
 -0.426292085556790      -0.586992194089641      -0.764665384659900     
 -0.864391496045899       -1.09075133056193     
  -20.1317471146607       -19.9210906367473       -19.6229186973772     
  -19.2951156679829       -18.8867276411522       -18.4869928910827     
  -18.0542422825766       -17.5520275777235     
  1.551402574593396E-003  0.000000000000000E+000
  0.991813369906298       0.000000000000000E+000
  0.994594663105971       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
