         180           8
  0.499369447451835       0.245011411780162      -1.837090806164452E-002
 -0.219880046107506      -0.346448135093546      -0.535115999250269     
 -0.717446386154027      -0.846620288196726     
  -20.2845021390216       -19.9562920930151       -19.5934088225737     
  -19.2158617652067       -18.8046362788465       -18.2794394936214     
  -17.8023019140986       -17.6236639463726     
  1.748339027684099E-003  0.000000000000000E+000
  0.991415236029694       0.000000000000000E+000
  0.994361014665006       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
