         180           8
 -0.165713954607315      -0.390993312576940      -0.535613345889445     
 -0.727554862110745      -0.958532269225374       -1.17042033194720     
  -1.39692064271974       -1.41540339090899     
  -19.2124913960505       -19.1325572775034       -18.8279462836166     
  -18.4610360635449       -18.0220970870051       -17.5687900184532     
  -17.1051511255050       -16.5861288831077     
  1.610874537010566E-003  0.000000000000000E+000
  0.991726616180436       0.000000000000000E+000
  0.994391517303187       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
