         180           8
 -0.505943523826870        4.94131404200205       -24.7293411353035     
   280.876066582857        173.712981105585       -27.0682530478464     
   5.23581189368504      -0.527658559955611     
 -0.101319410081362       0.989130138367120       -4.94460404681742     
   55.2569226187507        34.9333877218254       -5.43368898194637     
   1.05048002829549      -0.105839032276735     
  3.450135351983327E-003  0.000000000000000E+000
  0.992717000000000       0.000000000000000E+000
  0.993763000000000       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
