         180           8
  -1.24374216397828       -1.42998132545217       -1.55476960103989     
  -1.70195322332802       -1.75935292163360       -1.91549380523223     
  -2.07331861104776       -2.27529984019985     
  -16.4000463777363       -16.0972968124991       -15.7800285054680     
  -15.4405592821191       -15.0292895794079       -14.5702457272637     
  -14.1598124867293       -13.7540748200616     
  2.426704381087467E-003  0.000000000000000E+000
  0.990581090082763       0.000000000000000E+000
  0.993402173472920       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
