         180           8
   3.72137875239577        3.51031298219016        3.38076771047924     
   3.24909533921495        3.11480536958667        2.98492076903357     
   2.90278072969985        2.74262608764637     
  -19.1207169666165       -18.7844361723430       -18.3996058859807     
  -17.9604352723016       -17.5098039759114       -16.9981702753494     
  -16.0755519049148       -15.0918288993416     
  2.459779699652481E-003  0.000000000000000E+000
  0.992417304291831       0.000000000000000E+000
  0.995006693812711       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
