         180           8
  -1.53989513743465       -1.98369776839880       -2.34651101751909     
  -2.69429675155489       -3.01425098584367       -3.27480961070701     
  -3.52041998209234       -3.82184904314570     
  -18.1256747068936       -18.6428529823549       -18.9986127107913     
  -19.2613428509016       -19.4629228065929       -19.6839434201741     
  -19.8239699293949       -20.4317088341223     
 -1.805386475091383E-005  0.000000000000000E+000
  0.992121902771729       0.000000000000000E+000
  0.994987963702641       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
