         180           8
  -1.78247376253054       -2.15393789221675       -2.47172417149117     
  -2.76341970100453       -3.10024093083582       -3.39648009519246     
  -3.62822588229299       -3.79403481058488     
  -18.3923397369179       -18.6609742331609       -18.9763043503088     
  -19.2291511980833       -19.4767371654889       -19.7274869588024     
  -19.9090809424881       -20.0445567741720     
  4.388756562263733E-005  0.000000000000000E+000
  0.991865663275834       0.000000000000000E+000
  0.994822574344026       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
