         180           8
  -2.47029815784541       -2.96778649816990       -3.27841469809780     
  -3.58639879118162       -3.87185771156753       -4.11918561424047     
  -4.39662190062368       -4.47302833783526     
  -18.2334151299317       -18.4267256060224       -18.8013446717176     
  -19.1468845190118       -19.4627776624322       -19.7167615953225     
  -19.8877421248046       -20.0802341314571     
  4.168721795832360E-005  0.000000000000000E+000
  0.991780185497403       0.000000000000000E+000
  0.994696428932956       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
