         180           8
  -2.45200264546223       -2.88492808447941       -3.22253508228800     
  -3.52709113796746       -3.79148974428527       -4.06043444437568     
  -4.28864288210031       -4.60557163089135     
  -18.6628368605420       -18.8295780667930       -19.0374770196731     
  -19.2872450347176       -19.4855372667759       -19.6718360422243     
  -19.8518302965164       -20.0590649730586     
  6.946415154907080E-005  0.000000000000000E+000
  0.991638990058128       0.000000000000000E+000
  0.994565847034454       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
