         180           8
 -0.599112335924796      -0.832443207215795      -0.915687405702933     
  -1.05056962392730       -1.21398654951520       -1.36197687927978     
  -1.46302937917841       -1.57640927173236     
  -17.2096333437162       -17.0236853423699       -16.7023760535654     
  -16.3531539437601       -15.9661201609178       -15.5560264193500     
  -15.1628747341174       -14.7742998815841     
 -5.828312522653333E-004  0.000000000000000E+000
  0.992717159868499       0.000000000000000E+000
  0.995717943615639       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
