         180           3
   3.84507166931342        5.60225638783243        7.51011625446325     
   21.3505223802519        22.0651867109766        22.7427619000100     
 -1.068170632431420E-003  0.000000000000000E+000
   1.00167457943938       0.000000000000000E+000
  0.998829222631166       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
