         180           8
  -3.30646977725861       -3.68003323463741       -3.96759390317707     
  -4.29263067060461       -4.58540325936817       -4.74723993981088     
  -5.04247058919665       -4.95394775656409     
  -17.3138100591899       -17.7191706299134       -17.9432490041358     
  -18.3251368392940       -18.8016337799860       -19.0515515186641     
  -19.6579315183231       -19.8720818494401     
  2.524061605899047E-004  0.000000000000000E+000
  0.993001365766486       0.000000000000000E+000
  0.995945397947076       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
