         180           3
 -0.943775605568494       -2.71615248331605       -4.08875577100732     
   14.6641869786828        14.9054528088830        14.9620737227968     
 -4.425768690425724E-004  0.000000000000000E+000
   1.00139657370301       0.000000000000000E+000
  0.998425045838971       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
