         180           8
  -5.11684019948976       -5.38874994808990       -5.64863878428311     
  -5.91537338593148       -6.18180372646252       -6.27596370644471     
  -6.47601088829754       -6.43164674794643     
  -17.5372505707738       -17.8373790047677       -18.0606748851453     
  -18.3248611769764       -18.6387437860828       -18.8707491221091     
  -18.9910033195990       -19.2475823832471     
  2.545033592030706E-004  0.000000000000000E+000
  0.992860071372534       0.000000000000000E+000
  0.995726627253110       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
