         180           8
 -0.421806233635479      -0.901545829338767       -1.30615752368114     
  -1.69910247727578       -2.02729302879273       -2.30775938801059     
  -2.54459065310251       -2.76499681695121     
  -18.2213057238369       -18.3681507418308       -18.6500927371679     
  -18.9404589054698       -19.2640673996329       -19.5027061114506     
  -19.7254973147670       -19.9364910662840     
  4.707605690106241E-004  0.000000000000000E+000
  0.992696614068397       0.000000000000000E+000
  0.995571704743305       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
