         180           3
 -0.456265441680927       -2.66129763654972       -4.31021767199086     
   13.4067755113977        13.5850099163805        13.6139554739505     
 -2.230323841557182E-004  0.000000000000000E+000
   1.00127456113727       0.000000000000000E+000
  0.998183224835710       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
