         180           8
  -4.31153599333201       -4.71882725495951       -5.02528432346151     
  -5.29723145453893       -5.57650637540419       -5.79588021858990     
  -6.00295093816800       -5.93800999242354     
  -17.5530244504274       -17.8057599972504       -18.0613096589382     
  -18.3092680589339       -18.6175552055390       -18.8500440716049     
  -18.9772346947880       -19.3445078417546     
  4.687112887630610E-004  0.000000000000000E+000
  0.992494924077704       0.000000000000000E+000
  0.995368160102357       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
