         180           3
 -3.475002399294640E-002  -1.60588769506874       -2.71690087874433     
   15.5653896368915        15.8231987250952        16.1209059651395     
 -6.351623498158254E-004  0.000000000000000E+000
   1.00127385445677       0.000000000000000E+000
  0.998070522482601       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
