         180           8
  -3.45496611516271       -3.83135314468492       -4.13917480452208     
  -4.42527036040189       -4.65804209225695       -4.82843828701284     
  -4.98726892903745       -4.95774877281117     
  -18.6137877598425       -18.7920302901518       -19.0594450487643     
  -19.3470474135277       -19.6605070054578       -19.8732250587142     
  -20.0968490498132       -20.5272805282729     
  1.096106828365427E-004  0.000000000000000E+000
  0.993109875689749       0.000000000000000E+000
  0.996292105406011       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
