         180           8
  -2.76667553367739       -3.23055689143083       -3.57895483230825     
  -3.96852652490018       -4.30700807589565       -4.53805230539405     
  -4.81298710753807       -4.96717545625657     
  -18.3394168009219       -18.6686723260459       -19.1229761433216     
  -19.8447106872780       -20.4765810381805       -20.8240452313309     
  -20.9926604742281       -21.3253701646318     
 -5.918025187827984E-005  0.000000000000000E+000
  0.993302161288939       0.000000000000000E+000
  0.996324180489783       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
