         180           8
 -0.880040703680232       -1.30616444306780       -1.63315759158780     
  -1.93687552783456       -2.26988081373839       -2.53540585516770     
  -2.76390578871731       -2.85236212358103     
  -18.8110032055616       -18.9598630379036       -19.2402986323247     
  -19.5244019882330       -19.7643055045449       -20.0480510260713     
  -20.2894353077917       -20.5652962138653     
  1.617475214126237E-004  0.000000000000000E+000
  0.993122946141321       0.000000000000000E+000
  0.996046612225931       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
