         180           8
  4.248439609752828E-002 -0.749952419291757       -1.48732700283204     
  -2.09559176532470       -2.65129990996461       -3.20108181720032     
  -3.69438500730567       -4.25946643309208     
  -12.9238118526076       -12.9528125050179       -13.1178111297670     
  -13.3007401011081       -13.4918668501345       -13.6968969502783     
  -13.9271736270879       -14.1732468676332     
  2.356001275761014E-004  0.000000000000000E+000
  0.993145606824533       0.000000000000000E+000
  0.995728630958003       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
