         180           3
   7.72459227885701        5.55240489314412        3.55001889453201     
   15.1851814680470        15.5105247133644        16.2170360502263     
 -6.417333925227773E-004  0.000000000000000E+000
   1.00174561918807       0.000000000000000E+000
  0.998504226092475       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
