         180           8
  -2.68656073216265       -2.91453508061446       -3.09246947544643     
  -3.26473942669678       -3.39415156837138       -3.56298649920768     
  -3.68636757302912       -3.82299497196632     
  -16.3314321521755       -16.0523290313102       -15.6991440208644     
  -15.2712878546049       -14.8234890641246       -14.3910670773247     
  -14.0040901440868       -13.4056248419021     
  4.642815947978079E-004  0.000000000000000E+000
  0.992582046252000       0.000000000000000E+000
  0.995340228996781       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
