<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;"> -1.049015463E-02  3.125107716E-04  6.192332310E-05  9.236887424E-05  rotation in radian
 -1.032581E+01  dx in pixels
 -3.007959E+01  dy in pixels
      1.014570  scalx
      1.022725  scaly
        16.000  tolerance
  0.000000E+00  distortion
</pre></body></html>