         180           8
 -0.720772994947056      -0.982878699820302       -1.13391815622626     
  -1.32709221424830       -1.54573158035183       -1.66531712779961     
  -1.73584414542653       -1.89398629153238     
  -23.3002781728243       -23.1074189663642       -22.8454841146071     
  -22.6012465186484       -22.3189289102863       -21.9524394272947     
  -21.5308974252274       -21.1060369049621     
 -2.009034506782982E-003  0.000000000000000E+000
  0.992942465209748       0.000000000000000E+000
  0.995847035629441       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
