         180           3
 -7.484906722388641E-002   1.55910739687509        3.58388169545324     
   10.9634991367033        11.4863447386225        12.1075307995949     
 -7.851012251188494E-004  0.000000000000000E+000
   1.00149062094852       0.000000000000000E+000
  0.998177338806042       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
