         180           8
  -3.85790157502204       -4.28702130733997       -4.77967429452473     
  -5.27152489051979       -5.64286779882030       -6.00202618318520     
  -6.35953035984619       -6.74541935031651     
  -16.5356844151790       -16.5884577719514       -16.6330548621854     
  -16.6853529135382       -16.7292751212931       -16.8325884360668     
  -16.9440352370221       -17.0125645878849     
 -2.103540559434384E-003  0.000000000000000E+000
  0.992659038583479       0.000000000000000E+000
  0.995438813188028       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
