         180           3
   7.06278341274812        5.60440830751278        4.50410962406514     
   16.2236803544327        16.9142231177018        17.2735052791067     
 -1.130416289261893E-003  0.000000000000000E+000
   1.00164316159382       0.000000000000000E+000
  0.998332514072175       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
