         180           8
   6.10328370037819        5.46571585497899        4.83373420905183     
   4.23662213843552        3.60720552448254        2.92624620023547     
   2.24376276610269        1.66271391228198     
  -16.0385902681228       -16.9232125722232       -17.4265047147315     
  -17.6628694661904       -17.6351429885276       -17.8356689796753     
  -18.1150643400342       -18.2877186558065     
 -1.995953461011382E-003  0.000000000000000E+000
  0.992641129884563       0.000000000000000E+000
  0.995256535138166       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
