         180           3
   8.09912835430495        5.98057147309747        3.87933929919761     
   13.7323230622375        14.4067514331914        14.9682298233992     
 -8.326214285330041E-004  0.000000000000000E+000
   1.00215124766293       0.000000000000000E+000
  0.998534873665215       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
