         180           8
  0.443661470878524      -0.200994422576513      -0.811667298964891     
  -1.42367683641263       -2.05067888874334       -2.59750025528645     
  -3.11737575847729       -3.68364813287591     
  -16.1863290856954       -16.2279895523213       -16.3478286537006     
  -16.4765085819288       -16.6376434269997       -16.8324245185009     
  -17.0245351921722       -17.1985150293470     
 -2.055934581531388E-003  0.000000000000000E+000
  0.992608868544607       0.000000000000000E+000
  0.995008003856741       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
