         180           3
   7.84362832628188        5.86411672590088        4.01643919264032     
   15.0430770577357        15.5949360837276        15.9810970578061     
 -1.083222951037227E-003  0.000000000000000E+000
   1.00198055906591       0.000000000000000E+000
  0.998443408247997       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
