         180           8
   17.6097563840986        17.0436312016018        16.4249715855895     
   15.7987933687038        15.1366946417318        14.4711495201945     
   13.8558168563121        13.1746367747433     
  -33.8839268030434       -33.9361361665621       -33.9783599761034     
  -34.0357266620080       -34.1226737913584       -34.2663267534070     
  -34.4462047671477       -34.6104558919900     
 -3.887948299656798E-003  0.000000000000000E+000
  0.992786055317982       0.000000000000000E+000
  0.995872088875169       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
