         180           8
   15.4769587472900        14.9719089456389        14.4429511040928     
   13.8890293732098        13.2879536434652        12.6523853445741     
   12.0257023001619        11.3546676894874     
  -33.5793972723016       -33.7512133220707       -33.7899677521681     
  -33.8235091898929       -33.9111198037218       -34.0852092687642     
  -34.3088276871721       -34.5212926041777     
 -3.834861560969341E-003  0.000000000000000E+000
  0.992821104614194       0.000000000000000E+000
  0.995572911990560       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
