         180           8
   11.0676818617811        10.3614703679037        9.76465726167480     
   9.16584079989443        8.51656528673584        7.96172680069867     
   7.41070373747294        6.85437624862660     
  -31.9827514118876       -32.1112412336019       -32.2777762853824     
  -32.4715554064500       -32.7104104619110       -33.0150764283047     
  -33.3237438886805       -33.6775447537039     
 -3.886530209998736E-003  0.000000000000000E+000
  0.992981588454013       0.000000000000000E+000
  0.995838157873513       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
