         180           8
   4.49616558612097        4.27511464850652        4.19664387849338     
   4.02233195595490        3.95350522780379        3.95589789545535     
   3.81565855409565        3.64272298900645     
  -34.7298164645658       -34.7787545469986       -34.3882524180623     
  -34.1105594229539       -33.8128091804642       -33.4558680829651     
  -33.1156949338904       -32.4406075140343     
 -3.258009032306355E-003  0.000000000000000E+000
  0.991165675651264       0.000000000000000E+000
  0.997289365531998       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
