         180           8
   8.57336929351964        7.98611075077727        7.34417141620632     
   6.69124189334593        6.07598403109083        5.48677199107627     
   4.90590230888087        4.28563208750735     
  -31.2160561391930       -31.2156276870910       -31.3048391025690     
  -31.4736414953618       -31.7249469440681       -31.9757143442792     
  -32.2704279661767       -32.4346231278650     
 -3.930739644444808E-003  0.000000000000000E+000
  0.993067207868766       0.000000000000000E+000
  0.996081988361837       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
