         180           8
   8.61891589452376        7.87368017084739        7.19961223935739     
   6.59643908842954        5.97458008960878        5.35489312526777     
   4.80675049277868        4.24486715552517     
  -31.2612002439326       -31.3225520130061       -31.4672990312114     
  -31.6434289811475       -31.9031955021027       -32.1314545894995     
  -32.3127509681317       -32.6606175454090     
 -3.960580164891744E-003  0.000000000000000E+000
  0.992878332972277       0.000000000000000E+000
  0.996181559597103       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
