         180           8
   8.49030870474472        157.701978199376        259.616040850586     
  -199603.968193312       -4026925.31095247       -30921480.4609300     
  -147262099.926479       -523885966.222222     
  -36.1145881399912       -4783.71889926408       -8615.26774828891     
   6699381.29752262        134551056.325737        1031215745.82807     
   4905965687.31419        17441391274.6667     
 -3.847955330865808E-003  0.000000000000000E+000
  0.992335941859304       0.000000000000000E+000
  0.995071081723665       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
